ALTER TABLE `installations`
ADD COLUMN `voltage` VARCHAR(255) NULL,
ADD COLUMN `phase_neutral_ground` VARCHAR(255) NULL,
ADD COLUMN `breaker_output` VARCHAR(255) NULL;
