CREATE TABLE IF NOT EXISTS weather_status (
  id SERIAL PRIMARY KEY,
  "timestamp" TIMESTAMP DEFAULT CURRENT_TIMESTAMP,
  temperature FLOAT,
  humidity FLOAT,
  wind_speed FLOAT,
  precipitation FLOAT,
  alert_status BOOLEAN DEFAULT FALSE,
  alert_message VARCHAR(255)
);