
CREATE TABLE IF NOT EXISTS papers (
    id INT AUTO_INCREMENT PRIMARY KEY,
    title VARCHAR(255) NOT NULL,
    authors VARCHAR(255) NOT NULL,
    publication VARCHAR(255),
    year INT,
    notes TEXT,
    created_at TIMESTAMP DEFAULT CURRENT_TIMESTAMP
);
